A polynomial approach to PHM method

In this paper a local (third order accurate) shock capturing method for hyperbolic conservation laws is presented. The method has been made with the same idea as PHM method, but with a simpler reconstruction. A comparison with the classic high order methods is discussed.

Key Words. Conservation laws, high order methods, total variation

AMS(MOS) subject classifications. 65M05,65M10.