Local Total Variation Bounded methods for hyperbolic conservation laws

In this paper a family of local third order polynomic shock capturing methods for hyperbolic conservation laws is presented. We put out the fundamental aspects of original Piecewise Hyperbolic Method (PHM). Some numerical experiments are analyzed.

Key Words.

AMS(MOS) classification.